# $Id$
# By D.Vakatov, NCBI
#
# Configuration file to be used by DATATOOL when it generates the source
# code for the "sample_asn.asn" ASN.1 spec.


[-]
; Only if it's going into a DLL on MS-Windows
;_export = NCBI_SAMPLE_ASN_EXPORT
