[-]
_export = NCBI_SEQLOC_EXPORT

[Seq-id]
gi._type = ncbi::TGi
gi._storage_type = ncbi::TIntId

[Seq-interval]
from._type = TSeqPos
to._type   = TSeqPos

[Seq-point]
point._type = TSeqPos

[Packed-seqpnt]
points._type   = vector
points.E._type = TSeqPos

[Na-strand]
_packedtype = unsigned char
